%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%
%  This files contains initial values
%  of Vaucanson's parameter for slides
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%
%%%%%%%%%%%%%%
% State aspect
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\SetStateLabelColor{Sepia}
\SetStateLabelScale{1.7}
\SetStateLineWidth{2pt}
\SetStateLineColor{blue}
\SetStateFillColor{cyan}
\FixDimState{solid}{YellowOrange}{1}{YellowOrange}{white}
%%%%%%%%%%%%%%
% Edge aspect
%%%%%%%%%%%%%%
\SetEdgeLabelColor{blue}
\SetEdgeLabelScale{1}
\SetEdgeLineWidth{1.2pt}
\SetEdgeLineColor{magenta}
\FixDimEdge{dashed}{1.2}{Apricot}{Apricot}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%% Scales  --- Default settings
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\renewcommand{\LargeScale}{1.5}
\renewcommand{\MediumScale}{1.16}
\renewcommand{\SmallScale}{0.92}
\renewcommand{\TinyScale}{0.75}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%% Initialization
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\HideFrame
\HideGrid
\MediumPicture
\HideName
\RigidLabel
\FullState
\MediumState
